!CHGUIC   created by TECO on  9/26/79
!CHGUIC	is	a program to change the uic of any file or set of files.
!		FILES: CHGUIC.MAR,ERROR.MAR
!		SYMBOL: CHGUIC=$CHGUIC
!		I have this installed with LOG_IO privilege.
!		Installing it with privilege is only desired if you have a
!		"friendly" system.
!ERROR.MAR	a subroutine package to enhance the explanation and
!		simplify the signaling of RMS error messages.
!
!		Wendy Koenig
!		Dialog Systems
!		32 Locust St.
!		Belmont, Mass. 02178
!		617-489-2830
!
Changes the uic of a file (or files).
If UIC is not specified, nothing happens.
You can determine your UIC by typing 'UIC<CR>' or
	by getting a DIR/FU of your LOGIN.COM file.


Format:
CHGUIC/UIC:[xxx,yyy] file-spec
*Parameters
file-spec
 Specifies the name of the file(s) to be changed. No default extension.
*Qualifiers
/UIC
 Specifies the new uic, in octal.
 The directory is left unaltered but the uic is changed.
 If UIC is not specified, nothing is changed.
