				FILDSP

	FILDSP is a program which may be used to display the useful
	information contained in a file header. The display is in
	english sentences rather than the octal numbers available
	from the DUMP/HEADER command.

	In addition, FILDSP calls a routine that may prove useful
	in other programs. The routine is TRNLOG. TRNLOG is a routine
	which may be called to convert a logical name to it's lowest
	form (i.e., all logical name translation that can be
	done, is).
