1 SYSUSE
-- Derrell Piper

  Displays job process information on all or selected processes on the 
system.
  SYSUSE displays the number of processes specified by the qualifier
WINDOW_DEPTH.  The default display window is 22 processes.  At 22 or 
less processes, the screen is dynamically refreshed.
  The processes are displayed in their slot order, and the starting 
process is controlled by the qualifier STARTING_SLOT.  The default is 
to display from slot 0.  Pressing the Down-Arrow key will move the 
window down 16 slots.  Likewise, the Up-Arrow key will move the window
up 16 slots.
  Additionally, the top line of the display shows the dynamic size of
free and modified page lists, the average process page count, global 
page count, and wssize.  Also the number of interactive processes and
total number of processes is displayed.
  To exit SYSUSE, type Control-Y.

2 Qualifiers

/INTERVAL
  
  Format:
	SYSUSE/INTERVAL=sec

  Specifies that the repeat time for screen refresh.  The interval may 
be between 0 and 9 seconds.  The default time is 3 seconds.

/TYPE

  Format:
	SYSUSE/TYPE=type

  Allows you to select which type of process you wish to look at.  
There are currently 4 known classes.

  ALL          -  All processes on the system
  BATCH        -  Displays only batch jobs
  DETATCHED    -  Display only detached processes
  INTERACTIVE  -  Display only interactive processes
  NETWORK      -  Display only network tasks

The default type is INTERACTIVE.  The keyword can be abreviated to a 
minimum of three characters (eg, INT).

/REPEAT

  Format:
	SYSUSE/[NO]REPEAT

  Specifies that the program should continuosly update the displayed 
information.  The default is REPEAT.

/STARTING_SLOT

  Format:
	SYSUSE/STARTING_SLOT=starting_slot_number

  Specifies the starting slot after which processes should be 
displayed.  The slot number is the last four digits of a processes' PID. 
The PID can be obtained by doing a USERS or SHOW SYSTEM.  The defualt 
is to start at slot 0.

/WIDE

  Format:
	SYSUSE/WIDE

  Specifies that the program should display the information on a 132
column wide screen.  The default is /NOWIDE.
  Specifying the /WIDE procedure will show more information than is
normally displayed. 

/WINDOW_DEPTH

  Format:
	SYSUSE/WINDOW_DEPTH=size

  Specifies the size of the display window.  If less than 22, the
screen is updated dynamically.  If greater than 22, a scrolling region
is set, the processes are scrolled, and the screen is cleared at the
beginning of the next display cycle.  The default is 22.  A maximum
window size of 44 (two full screens) is allowed. 

/VIRTUAL

  Format:
	SYSUSE/VIRTUAL

  Specifies that SYSUSE should display virtual terminal names if 
virtual terminals have been enabled.  This mode is the default.

/PHYSICAL

  Format:
	SYSUSE/PHYSICAL

  Specifies that SYSUSE should display physical terminal names instead
of virtual terminal names if virtual terminals have been enabled.
If this qualifier is not specified, SYSUSE will display the virtual
terminal name if available.

/USERNAME

  Format:
	SYSUSE/USERNAME

  Specifies that SYSUSE should display the username when not in wide
mode.  By default, SYSUSE will display the process name.

/PROCESS_NAME

  Format:
	SYSUSE/PROCESS_NAME

  Specifies that SYSUSE should display the process name when not in
wide mode.  This is the default and need not be specified.

